.test{
    background-attachment: fixed !important;
}

.img-frame-large{
    position:relative;
}
.ct-header__toolbar{
    display: none;
}
.ct-header{
    padding: 1rem 0 1rem!important;
}


.grid_img {
    box-shadow: 0px 1px 11px 2px #888888b0;
}

.grid_text {
    box-shadow: 0px 1px 11px 2px #888888b0;
}
.grid_text a {
    text-decoration: none;
}
.seckur h3{
    font-size:22px;
   
}

    @media(min-width:768px)and (max-width:1024px){
    .seckur h3 {
    font-size: 21px;
}
}
 #infobox{
    height: 200px;
    }
    
    

    @media screen and (max-width:1024px){ 
#infobox{
    height: 300px;
    }
    }